CREATE TABLE `hku_base`.`version` (
    `version` INT(11) UNSIGNED NOT NULL
) COLLATE = 'utf8mb4_general_ci' ENGINE = InnoDB;

INSERT INTO `hku_base`.`version` (version) VALUES (1);